-- 每日汇报：同步 Dify 知识库记录
CREATE TABLE IF NOT EXISTS `ydoyun_ai_assistant_dify_kb_sync_log` (
    `id` bigint NOT NULL AUTO_INCREMENT COMMENT '主键',
    `module_code` varchar(128) NOT NULL DEFAULT '' COMMENT '模块编码',
    `module_name` varchar(128) NOT NULL DEFAULT '' COMMENT '模块名称',
    `report_id` bigint DEFAULT NULL COMMENT '触发同步的汇报主表 ID',
    `dataset_id` varchar(64) NOT NULL DEFAULT '' COMMENT 'Dify 数据集 ID',
    `sync_status` varchar(32) NOT NULL DEFAULT '' COMMENT 'success / fail',
    `sync_message` varchar(1024) NOT NULL DEFAULT '' COMMENT '说明或错误信息',
    `creator` varchar(64) DEFAULT '' NULL COMMENT '操作人',
    `create_time` datetime DEFAULT CURRENT_TIMESTAMP NOT NULL COMMENT '创建时间',
    `updater` varchar(64) DEFAULT '' NULL COMMENT '更新者',
    `update_time` datetime DEFAULT CURRENT_TIMESTAMP NOT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
    `deleted` bit(1) DEFAULT b'0' NOT NULL COMMENT '是否删除',
    `tenant_id` bigint DEFAULT 0 NOT NULL COMMENT '租户编号',
    PRIMARY KEY (`id`),
    KEY `idx_tenant_module_time` (`tenant_id`, `module_code`, `create_time`),
    KEY `idx_report_id` (`report_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='每日汇报-Dify知识库同步记录';
